Figure 4.3: Front and side views of the GA search space for a C/O 50:50 core with a “steep” internal chemical profile. Square points mark the locations of every model found by the GA with an r.m.s. deviation smaller than 3 seconds for the periods observed in GD 358. The dashed line shows the range of parameters considered by Bradley & Winget (1994b).